(GeV/c) t p 0 1 2 3 4 5 6 7 8 9

)^0π

)/(2 - + e + production cross section ratio: (e

-4 10

-3 10

-2 10 pp collider experiments = 7 TeV s ALICE: = 0.2 TeV s PHENIX:

= 52.7 GeV s CCRS: